0 2 4 6 8 10

-1 -0.5 0 0.5 1 1.5 2 DEDX (pads) VS LOG 10 P - deuterons

DEDX (pads) VS LOG 10 P - anti deuterons 0 2 4 6 8 10 12

-1 -0.5 0 0.5 1 1.5 2